CREATE TABLE "izotopy" (
	"F"	TEXT,
	"A"	INTEGER,
	"M"	TEXT,
	"Z"	INTEGER,
	"element"	TEXT,
	"J"	TEXT,
	"decay_mode"	TEXT,
	"branch_pct"	TEXT,
	"E_excitation"	TEXT,
	"Q"	REAL,
	"T12"	TEXT,
	"abundance"	TEXT,
	"atomic_mass"	REAL,
	"uncertain_in_mass"	REAL,
	"S"	TEXT,
	"date"	TEXT,
	"T12s"	REAL
);